           
           THE FOLLOWING KEYS HAVE SPECIAL FUNCTIONS WHILE LOGGING:
           --------------------------------------------------------

 <Alt-K>  Runs a CW KEYER.  As soon as the keyer screen is shown,
          you send CW via a COM or LPT port to your rig just by
          typing.  A CW KEYER HELP screen appears which shows how
          function keys are used to send or store CW memories.

 <Alt> +  Holding <Alt+F1> while on the logging screen sends CW from
   <F?>   MEMORY #1.  This works for <F1> through <F6> for all 6 CW
          memories.  (You can also use the numeric keypad keys 1-6 for
          sending CW memories, if you select this option with SETUP).

 <Alt-T>  Starts a 10-MINUTE ID TIMER.  This timer can be used to
          remind you to identify your station.  Press the <Alt> key
          along with the <T> key to start, stop, or reset the timer.

 <Alt-L>  Can be used to print an address label from either a callsign
          database, or from information you type into the label window.


 <Alt-W>  displays Worked All States information for the callsign currently
          entered.  A window showing QSL STATUS for each band and mode for
          this STATE will appear at the bottom of the screen, and you can
          update your WAS records.  If nothing is in the log STATE field, a
          full-screen WAS menu will appear.  [REGISTERED USER VERSION ONLY].

 <Alt-X>  displays DX Century Club information for the callsign currently
          entered.  A window showing QSL STATUS for each band and mode for
          this COUNTRY will appear at the bottom of the screen, and you can
          then update your DXCC records.  If nothing is in the log COUNTRY
          field, a DXCC menu will appear.  [REGISTERED USER VERSION ONLY].

 <Alt-G>  switches between the current RIG and a SECOND RIG interfaced to
          your computer serial port(s), as configured by the SETUP menu.
          If you have "NONE" selected as your SECOND RIG on the PREFERENCES
          section of SETUP, then when you hit <Alt-G> you will be in manual
          control of frequency and mode from the logging screen.


 <Alt-E>  displays a popup menu for EXTERNAL CONTROL.  There are three
          ways to control the data lines on the computer's parallel (LPT)
          port.  <F1> is MANUAL - where 1-8 correspond to the eight data
          lines.  <F2> is AUTO - where the lines are selected according to
          the frequency ranges specified in file LOG-EQF.FRQ.  <F3> is for 
          an external ANTENNA SWITCH, following the "CT" program standard.

  <Ctrl>  activates the SCRATCHPAD screen.  SCRATCHPAD can be used during a
          QSO to take notes that you don't need to save.  The SCRATCHPAD
          also provides a place to lookup calls in your callsign database.
          Each line in the SCRATCHPAD will be used to display information
          retrieved from the callsign database, providing a convenient way
          to keep names & QTH's straight during a roundtable discussion.
          If you have a TNC interfaced to the program, the bottom part of
          the screen will monitor the TNC activity.

 <Scroll  Inhibits checking of duplicate or worked-before callsigns, so
  -Lock>  prior QSOs are not reported when the callsign is entered.

   <F7>   Runs another program while keeping Log-EQF resident in memory.
          You can specify two programs on the SETUP menu that will appear
          on a popup window and can be run anytime you hit <F7>.  You may
          also run a program that you type in manually, or access the DXCC
          or WAS utility programs, or go to DOS.
  
 <F11>    keys may be used to run other programs from within Log-EQF.
   <F12>  Files SHELL11.BAT and SHELL12.BAT must be setup to run the
          programs desired.  Consult your DOS manual if you require
          assistance with setting up BATCH files.
   
    <~>   (tilde) is used to store text in a buffer to be "pasted" into a
          logbook field...

    <'>   (single left quote) is used to PASTE the text buffer into a logbook
          field.
   
   <Esc>  is used to leave the logging screen and return to the
          MAIN MENU.  Note that <Esc> is used to leave any Log-EQF
          screen, and return to the MAIN MENU.
          

  Log-EQF is a SHAREWARE program. If you have not already registered
  with the author of Log-EQF, please do so before continuing to use
  this software.  Registration is easy and inexpensive - just $30 US!
  You can register using your credit card by calling: 1-800-995-1605.
  Outside the U.S. and Canada, to order call: 619-685-7291 (24 hours).
  
  Registrations, questions, and comments about Log-EQF may be sent to:
  
             ┌─────────┐
       ┌─────┴───┐     │              (R)          EQF Software
     ──│         │o    │──────────────────
       │   ┌─────┴╨──┐ │  Association of           Tom Dandrea, N3EQF
       │   │         │─┘  Shareware                396 Sautter Drive
       └───│    o    │    Professionals            Coraopolis, PA 15108
     ──────│    ║    │────────────────────         USA
           └────╨────┘    MEMBER

  If you are already a REGISTERED USER, thank you!       73 de N3EQF
